SET FOREIGN_KEY_CHECKS =0;
UPDATE process SET 
prc_serial_prc = 351,
weight_prc = 2
WHERE serial_prc = 300;

INSERT INTO process (serial_prc, prc_serial_prc, name_prc, link_prc, weight_prc, status_prc) VALUES
(348, 207, 'Visitantes', '#', '2.0', 'LOCKABLE'),
(349, 348, 'Nuevo Visitante', 'modules/guest/fNewGuest', '1', 'LOCKABLE'),
(350, 348, 'Actualizar Visitante', 'modules/guest/fSearchGuest', '2', 'LOCKABLE'),
(351, 207, 'Ficha Médica', '#', '62.7', 'LOCKABLE'),
(352, 351, 'Nueva/Actualizar', 'modules/medical_file/fSelectPatient', '1.0', 'LOCKABLE');

INSERT INTO profile_process (serial_prf, serial_prc, status_ppr) VALUES
(1,349,'ACTIVE'),
(1,350,'ACTIVE'),
(1,352,'ACTIVE');
SET FOREIGN_KEY_CHECKS =1;
