--
-- Table structure for table `cat_lunch_employee`
--

SET FOREIGN_KEY_CHECKS = 0;
DROP TABLE IF EXISTS `cat_lunch_employee`;

CREATE TABLE `cat_lunch_employee` (
  `serial_cle` int(11) NOT NULL auto_increment,
  `name_cle` TEXT NOT NULL ,
  `description_cle` TEXT NOT NULL ,
  `status_cle` ENUM('ACTIVE','INACTIVE') DEFAULT 'ACTIVE',
  PRIMARY KEY (`serial_cle`)
) ENGINE=InnoDB DEFAULT CHARSET=latin1;
SET FOREIGN_KEY_CHECKS = 1;