ALTER TABLE `profile_process` CHANGE `status_ppr` `status_ppr` ENUM('ACTIVE','BLOCKED','INACTIVE') CHARACTER SET latin1 COLLATE latin1_swedish_ci NULL DEFAULT 'ACTIVE'; 