CREATE TABLE `app_setup` (
  `serial_aps` INT NOT NULL AUTO_INCREMENT,
  `mail_from_aps` TEXT NULL,
  `mail_to_aps` TEXT NULL,
  `status_aps` ENUM('ACTIVE', 'INACTIVE') NULL,
  PRIMARY KEY (`serial_aps`));
