insert into process (serial_prc,prc_serial_prc, name_prc, link_prc, weight_prc, status_prc) values(809,52,'Sustitución de Usuarios','laravel/public/userSubstitution',999,'LOCKABLE');

insert into allowed_pages_by_process values(809,'UserSubstitutionController@getIndex');
insert into allowed_pages_by_process values(809,'UserSubstitutionController@postLoadEmployeeContainer');
insert into allowed_pages_by_process values(809,'UserSubstitutionController@postLoadStudentContainer');
insert into allowed_pages_by_process values(809,'UserSubstitutionController@postLoadGuardianContainer');
insert into allowed_pages_by_process values(809,'UserSubstitutionController@postUserSearch');
insert into allowed_pages_by_process values(809,'UserSubstitutionController@postLoadProfile');
insert into allowed_pages_by_process values(809,'UserSubstitutionController@postChange');

CREATE TABLE log_alternative_session (
  `serial_las` INT NOT NULL AUTO_INCREMENT,
  `serial_real_usr` INT NOT NULL,
  `serial_alternative_usr` INT NOT NULL,
  `serial_real_prf` INT NOT NULL,
  `serial_alternative_prf` INT NOT NULL,
  `proccess_las` Text NULL,
  `data_send_las` Text NULL,
  `date_las` DATETIME NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP, -- fecha en que se crea el registro
  `status_las` ENUM('ACTIVE','INACTIVE') NOT NULL DEFAULT 'ACTIVE',
  PRIMARY KEY (`serial_las`)
);

alter table process add column allow_prc ENUM('YES', 'NO') NULL AFTER id_exclusion;