INSERT INTO `process` (`serial_prc`, `prc_serial_prc`, `name_prc`, `link_prc`, `weight_prc`, `status_prc`) VALUES ('857', '311', 'Ficha médica', 'laravel/public/medicalFile/index', '1', 'LOCKABLE');
insert into allowed_pages_by_process values ('857','medicalfilecontroller@getindex');