INSERT INTO process (`serial_prc`, `prc_serial_prc`, `name_prc`, `link_prc`, `weight_prc`, `status_prc`)
VALUES ('864', '1', 'Manejo de Perfiles', 'laravel/public/manageProfile', '1', 'LOCKABLE');


CREATE TABLE IF NOT EXISTS most_used_options (
  serial_msp int NOT NULL AUTO_INCREMENT,
  serial_prc int NOT NULL,
  serial_usr int NOT NULL,
  serial_prf int NOT NULL,
  date_msp DATETIME NULL,
  status_msp enum('ACTIVE','INACTIVE') DEFAULT 'ACTIVE',
  PRIMARY KEY (serial_msp),
  CONSTRAINT `msp_prc`
    FOREIGN KEY (`serial_prc`)
    REFERENCES `process` (`serial_prc`)
    ON DELETE NO ACTION
    ON UPDATE NO ACTION,
  CONSTRAINT `msp_prf`
    FOREIGN KEY (`serial_prf`)
    REFERENCES `profile` (`serial_prf`)
    ON DELETE NO ACTION
    ON UPDATE NO ACTION
) ENGINE=InnoDB DEFAULT CHARSET=latin1;
