

-- Registros para registrar reporte en base con securidades verificar serial process


insert into process values(500,151,'Reporte Rubros','laravel/public/informationStatusDebts',1.03,'LOCKABLE',NULL );

insert into allowed_pages_by_process values(500,'informationstatusdebtsreportcontroller@getindex'),(500,'informationstatusdebtsreportcontroller@postreport'), (500,'schoolyearcontroller@getinvoicemonth');



