-- cambio de rango de dato para poder guardar correctamente el VMC

ALTER TABLE `visits_medical_center`
CHANGE COLUMN `bmi_vmc` `bmi_vmc` DECIMAL(5,2) NULL DEFAULT NULL ;

-- to update wrong values run
-- update visits_medical_center set bmi_vmc=(weight_vmc/(height_vmc*height_vmc));