

-- cambia el link de la pantalla anterior de calificacion de esxamens por la nueva;

-----   VERIFICAR EL SERIAL QUE SERIAL_PRC SEA 394 ANTES DE CORRER ESTE ESCRIPT
UPDATE `process` SET `link_prc`='laravel/public/gradePeriodExam/index' WHERE `serial_prc`='364';
select * from allowed_pages_by_process;

insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@getindex');
insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@getsubjects');
insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@getperiods');
insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@poststutentperiodexam');
insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@posthistoyexam');

insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@posthistoyexam');
insert into allowed_pages_by_process(serial_prc,url_dsc)values(364,'gradeperiodexamcontroller@postsavegrades');
INSERT INTO `allowed_pages_by_process` (`serial_prc`, `url_dsc`) VALUES 
('364', 'gradecriteriacontroller@getpaievaluation'),
('364', 'gradecriteriacontroller@postpaievaluation'),
('364', 'gradecriteriacontroller@getexportexcelpai');